From a196acf14daf613e931e39dd0daa927ebc89099d Mon Sep 17 00:00:00 2001
From: pacien
Date: Sat, 11 Apr 2020 03:57:44 +0200
Subject: viewer: ldthumbnail: reduce non-picture element size

They were too big and not dense enough on small screens
---
 viewer/src/components/LdThumbnail.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'viewer/src/components/LdThumbnail.vue')

diff --git a/viewer/src/components/LdThumbnail.vue b/viewer/src/components/LdThumbnail.vue
index f8343eb..4ab6446 100644
--- a/viewer/src/components/LdThumbnail.vue
+++ b/viewer/src/components/LdThumbnail.vue
@@ -67,7 +67,7 @@ export default class LdThumbnail extends Vue {
 .thumbnail-other {
   width: $thumbnail-other-size;
   height: $thumbnail-other-size;
-  padding-top: $body-line-height * 2em;
+  padding-top: $body-line-height * 1em;
   text-align: center;
   word-break: break-word;
   overflow: hidden;
-- 
cgit v1.2.3

