From cfc2f65479bca39e77cfc6b3e2437f6e8022496f Mon Sep 17 00:00:00 2001
From: pacien
Date: Mon, 10 Feb 2020 20:15:45 +0100
Subject: viewer: remove last row forced offset

It was only making things worse in the end.
---
 viewer/src/views/GalleryDirectory.vue | 3 ---
 1 file changed, 3 deletions(-)

(limited to 'viewer/src/views/GalleryDirectory.vue')

diff --git a/viewer/src/views/GalleryDirectory.vue b/viewer/src/views/GalleryDirectory.vue
index baf627e..38686a8 100644
--- a/viewer/src/views/GalleryDirectory.vue
+++ b/viewer/src/views/GalleryDirectory.vue
@@ -24,9 +24,6 @@
         <ld-thumbnail :item="item" />
       </router-link>
     </div>
-    <div>
-      <!-- Empty item for better flex layout -->
-    </div>
   </div>
 </template>
 
-- 
cgit v1.2.3

