From 95f75d95c12e95fd5c54c2203e031b0a593c7550 Mon Sep 17 00:00:00 2001
From: pacien
Date: Mon, 10 Feb 2020 20:13:50 +0100
Subject: viewer: move temporary mode selector

Out of the sidebar so we can continue polishing the interface without interference.
---
 viewer/src/views/PanelLeft.vue | 3 ---
 1 file changed, 3 deletions(-)

(limited to 'viewer/src/views/PanelLeft.vue')

diff --git a/viewer/src/views/PanelLeft.vue b/viewer/src/views/PanelLeft.vue
index 2c00bbf..91d193c 100644
--- a/viewer/src/views/PanelLeft.vue
+++ b/viewer/src/views/PanelLeft.vue
@@ -20,9 +20,6 @@
 <template>
   <div class="flex-column">
     <ld-tag-input />
-    <!-- TODO: Remove when #21 is resolved -->
-    <ld-mode-radio />
-    <!-- === -->
     <h1 class="title">{{$t('panelLeft.propositions')}}</h1>
     <ld-proposition class="scrollbar no-scroll-x" />
   </div>
-- 
cgit v1.2.3

